1 10 10^2

10^3

0 2000 4000 6000 8000 10000

Mean RMS 7380. 520.7

N_{pe} (Downstream)

Counts

E_γ=2000 MeV Θ = 12^o

45 pe/MeV conversion factor

1 10 10^2

10^3

0 2000 4000 6000 8000 10000

Mean RMS 2940. 208.9

N_{pe} (Upstream)

Counts

E_γ=2000 MeV Θ = 12^o

45 pe/MeV conversion factor

1 10 10^2

10^3

0 1000 2000 3000 4000

Mean RMS 3771. 270.6

N_{pe} (Downstream)

Counts

E_γ=2000 MeV Θ = 12^o

23 pe/MeV conversion factor

1 10 10^2

10^3

0 1000 2000 3000 4000

Mean RMS 1502. 111.5

N_{pe} (Upstream)

Counts

E_γ=2000 MeV Θ = 12^o

23 pe/MeV conversion factor

1 10 10^2

10^3

0 500 1000 1500 2000

Mean RMS 1016. 80.34

N_{pe} (Downstream)

Counts

E_γ=2000 MeV Θ = 12^o

6.2 pe/MeV conversion factor

1 10 10^2

10^3

0 500 1000 1500 2000

Mean RMS 405.0 37.93

N_{pe} (Upstream)

Counts

E_γ=2000 MeV Θ = 12^o

6.2 pe/MeV conversion factor